Scale chrUn_DS484424v1: Gap

miRNA ncRNA tRNA miscRNA

RepeatMasker

1 kb dm6 100 200 300 400 500 600 700 800 900 1,000 1,100 1,200 1,300 1,400 1,500 1,600 1,700 1,800 1,900 2,000 2,100 Gap Locations

FlyBase Protein-Coding Genes FlyBase Pseudogenes FlyBase Non-protein Coding Genes

Repeating Elements by RepeatMasker